-0.4

-0.2

0

0.2

0.4

N m -2

a) τ^x

-0.4

-0.2

0

0.2

0.4 b) τ^y

-240

-200

-160

-120 -80 -40 0

Depth (m)

10

10

10

10

10

10

10

10

10

20

20

20

20

20

20

20

20

20

20

20

20

30

30

30

30

30

30

30

30

30

40

40

40

4050

50

-10

-10

-10

-10

-10

-10

-20

-20

-20

-20

-20

-20

-30

c) u

11/15 11/25 12/5 12/15 12/25 1/4 1/14 1/24 2/3 2/13

-240

-200

-160

-120 -80 -40 0

10

10

10

10

10

10

10

10

10

10

10

10

20

30

30

-10

-10

-10

-10

-10

-10

-10

-10

-10

-20

-20

d) v

1992 1993