0 0.5 1 1.5 2 200 250 300 350 400 450 500

Surface PO_4 pCO 2 atm (ppm) a.

Standard models (tau=30 days) tau=1 year tau=3days Std models: S Ocean depletion Std models: Global depletion

0 0.5 1 1.5 2 200 250 300 350 400 450 500

Surface PO_4 (S30S)

2 atm b.

0 0.5 1 1.5 2 200 250 300 350 400 450 500

Surface PO_4 (60S to 80S)

0 0.5 1 1.5 2 200 250 300 350 400 450 500

[Preformed PO_4]

d.